From 672044016f0f2a28388d4af37d2b49afc7ff23be Mon Sep 17 00:00:00 2001
From: Antonio Gallo <tonicucoz@gmail.com>
Date: Mon, 9 Jul 2012 13:22:00 +0000
Subject: improved the free bios entry - Michał Masłowski and lammi87
 suggestions
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

---
 h-source/tables.sql | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'h-source/tables.sql')

diff --git a/h-source/tables.sql b/h-source/tables.sql
index 937b913..c757655 100644
--- a/h-source/tables.sql
+++ b/h-source/tables.sql
@@ -155,7 +155,7 @@ CREATE TABLE IF NOT EXISTS `hardware` (
   `subtype` char(15) NOT NULL,
   `driver` varchar(50) NOT NULL,
   `interface` char(15) NOT NULL DEFAULT 'not-specified',
-  `bios` char(15) NOT NULL DEFAULT 'not-specified',
+  `bios` char(20) NOT NULL DEFAULT 'not-specified',
   `webcam_type` varchar(100) NOT NULL,
   `webcam_works` varchar(30) NOT NULL DEFAULT 'not-specified',
   `sound_card_works` varchar(30) NOT NULL DEFAULT 'not-specified',
@@ -404,7 +404,7 @@ CREATE TABLE IF NOT EXISTS `revisions` (
   `subtype` char(15) NOT NULL,
   `driver` varchar(50) NOT NULL,
   `interface` char(15) NOT NULL DEFAULT 'not-specified',
-  `bios` char(15) NOT NULL DEFAULT 'not-specified',
+  `bios` char(20) NOT NULL DEFAULT 'not-specified',
   `webcam_type` varchar(100) NOT NULL,
   `webcam_works` varchar(30) NOT NULL DEFAULT 'not-specified',
   `sound_card_works` varchar(30) NOT NULL DEFAULT 'not-specified',
-- 
cgit v1.2.3

