From 931861e0513be7e110fc1d98e366cbd4efb831ce Mon Sep 17 00:00:00 2001
From: Antonio Gallo <tonicucoz@gmail.com>
Date: Mon, 18 Apr 2011 16:09:47 +0000
Subject: h-source:added acquisition cards and fingerprint readers - part 1

---
 h-source/tables.sql | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'h-source/tables.sql')

diff --git a/h-source/tables.sql b/h-source/tables.sql
index e914867..34c8ab9 100644
--- a/h-source/tables.sql
+++ b/h-source/tables.sql
@@ -96,7 +96,8 @@ create table hardware (
 	webcam_type varchar(100) CHARACTER SET utf8 not null,
 	webcam_works varchar(30) CHARACTER SET utf8 not null default 'not-specified',
 	sound_card_works varchar(30) CHARACTER SET utf8 not null default 'not-specified',
-	bluetooth_works varchar(30) CHARACTER SET utf8 not null default 'not-specified'
+	bluetooth_works varchar(30) CHARACTER SET utf8 not null default 'not-specified',
+	fingerprint_works varchar(30) CHARACTER SET utf8 not null default 'not-specified'
 )engine=innodb;
 
 create table revisions (
@@ -126,6 +127,7 @@ create table revisions (
 	webcam_works varchar(30) CHARACTER SET utf8 not null default 'not-specified',
 	sound_card_works varchar(30) CHARACTER SET utf8 not null default 'not-specified',
 	bluetooth_works varchar(30) CHARACTER SET utf8 not null default 'not-specified',
+	fingerprint_works varchar(30) CHARACTER SET utf8 not null default 'not-specified',
 	id_hard INT UNSIGNED NOT NULL
 )engine=innodb;
 
-- 
cgit v1.2.3

