From d8e1f81df2e40574c0e685910bf99407f7e66017 Mon Sep 17 00:00:00 2001
From: Antonio Gallo <tonicucoz@gmail.com>
Date: Wed, 13 Jul 2011 15:28:30 +0000
Subject: administrators can permanently delete a device page - part 1

---
 h-source/tables.sql | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'h-source/tables.sql')

diff --git a/h-source/tables.sql b/h-source/tables.sql
index b6914c9..ba40d5c 100644
--- a/h-source/tables.sql
+++ b/h-source/tables.sql
@@ -90,6 +90,7 @@ create table hardware (
 	ask_for_del char(4) not null default 'no',
 	deleted char(4) not null default 'no',
 	approved char(4) not null default 'yes',
+	cleared char(3) not null default 'no',
 	pci_id char(10) not null,
 	driver varchar(50) not null,
 	interface char(15) not null default 'not-specified',
@@ -134,6 +135,7 @@ create table revisions (
 	architecture char(15) not null default 'not-specified',
 	other_names text CHARACTER SET utf8 not null,
 	approved char(4) not null default 'yes',
+	cleared char(3) not null default 'no',
 	id_hard INT UNSIGNED NOT NULL
 )engine=innodb;
 
-- 
cgit v1.2.3

